p [GeV/c]

1 1.5 2 2.5 3 3.5 4 eσ (Center-<electron peak>)/

-10 -8 -6 -4 -2 0 2 4 Center of Distributions Electrons Pions Muons Kaons Protons

p [GeV/c]

2 4 6 8 10 12 14 16

Width/Electron Width

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 Width of Distributions Electrons Pions Muons Kaons Protons

p [GeV/c]

2 4 6 8 10 12 14 16 -1 10 1 10 210 310 410 510 610

Amplitude of Distributions

Electrons Pions Muons Kaons Protons

p [GeV/c]

1 1.5 2 2.5 3 3.5 4 eσ (Center-<electron peak>)/

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 Center of Electron Distribution