p [GeV/c]

1 1.5 2 2.5 3 3.5 4

Contamination of Electrons after TPC Cut

-3 10

-2 10

-1 10

p [GeV/c]

1 1.5 2 2.5 3 3.5 4

1 - Electron Efficiency of TPC Cut

-2 10

-1 10

1