tran

tstep 0.1 tstop 20. tstart 1. tmax 100. UIC (yes/no)no ac-sim

INCREM DEC NUMPOINT200 fstart 0.01 fstop 100.

vexp 1. 1. 0. 0. res val=3.00 res val=2.00

cap val=1.00 params

gnd gnd