CERES/NA45 Experimental Setup

• SiDC1+2: Vertex reconstruction and angle measurement • RICH1+2: Electron ID and angle measurement

• New cylindrical Time Projection Chamber with radial drift field, length 2 m, outer diameter 2.6 m • New magnet system; azimuthal deflection inside TPC • Not any more B-field between RICHES

Better mass resolution of spectrometar Improved RICH efficiency from combined use of 1 and 2