Systematical Errors

(preliminary)

• I Absolute procedure – efficiency – number of events overall ∼15% for m <0.2 – charged multiplicity

analysis cuts (S/B≪1) addit.10-20% for m >0.2 ⇒ ≤ 25 % for m > 0.2 GeV/c^2 • II Relative procedure – fit measured data to decay cocktail for m < 0.2 → lower bound to high mass region N_π0 /N_{ch} p_T -distrib. overall ∼8% for m < 0.2 y-distrib, η-and ω Dal. contrib.

analysis cuts (S/B≪1) as above

⇒ ≤20 % for m > 0.2 GeV/c^2 • Conclusion

– statistical error at 40 AGeV (∼30%) dominant