Acceptance

197Au + 197Au at 11 � AGeV=c

magnetic field optimized for positive particles

) central trigger (œ=œgeo = 14%) ) 10^5 particles per spill ) Fall 1993 - 2 � 10^6 central events ) Fall 1994 - 10 � 10^6 central events ) Fall 1995 - 50 � 10^6 central events