hp_xi - Data and RQMD

PRC 56(97)3254

RQMD 1.08: CASCADE mode RQMD 2.3: MEAN FIELD mode

⟨p_x⟩ = 1 N Z dN dp_t

(v_1 · p_t)dp_t = ⟨v_1⟩ · ⟨p_t⟩