Source Parameters from Deuterons

S. Johnson

) choose a source function for a finite expanding thermal

source (T, R)

) fit to proton data at all y and pt ) use coalescence to generate deuterons

R = 6:5^{+1:7}�_{0:4} fm T = 137^{+38}�_{12} MeV