PM1PM2PM3

q inputGate inqVt Multichannel Analyzer

DelayAmplifierGate GeneratorinoutDiscriminatorDiscriminatorAndlogic PM1 logic PM3PM1* gate delayed analog PM2

Zeity inx in xyoutOscilloscope PM3